/*
 Navicat Premium Data Transfer

 Source Server         : 远程
 Source Server Type    : MySQL
 Source Server Version : 50744 (5.7.44)
 Source Host           : 8.137.112.156:3307
 Source Schema         : crm

 Target Server Type    : MySQL
 Target Server Version : 50744 (5.7.44)
 File Encoding         : 65001

 Date: 18/09/2024 15:05:35
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for tool_qiniu_config
-- ----------------------------
DROP TABLE IF EXISTS `tool_qiniu_config`;
CREATE TABLE `tool_qiniu_config`  (
  `config_id` bigint(20) NOT NULL COMMENT 'ID',
  `access_key` text CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL COMMENT 'accessKey',
  `bucket` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL COMMENT 'Bucket 识别符',
  `host` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NOT NULL COMMENT '外链域名',
  `secret_key` text CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL COMMENT 'secretKey',
  `type` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL COMMENT '空间类型',
  `zone` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL COMMENT '机房',
  PRIMARY KEY (`config_id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_bin COMMENT = '七牛云配置' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of tool_qiniu_config
-- ----------------------------

SET FOREIGN_KEY_CHECKS = 1;
