/*
 Navicat Premium Data Transfer

 Source Server         : 远程
 Source Server Type    : MySQL
 Source Server Version : 50744 (5.7.44)
 Source Host           : 8.137.112.156:3307
 Source Schema         : crm

 Target Server Type    : MySQL
 Target Server Version : 50744 (5.7.44)
 File Encoding         : 65001

 Date: 18/09/2024 15:05:19
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for tool_email_config
-- ----------------------------
DROP TABLE IF EXISTS `tool_email_config`;
CREATE TABLE `tool_email_config`  (
  `config_id` bigint(20) NOT NULL COMMENT 'ID',
  `from_user` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL COMMENT '收件人',
  `host` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL COMMENT '邮件服务器SMTP地址',
  `pass` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL COMMENT '密码',
  `port` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL COMMENT '端口',
  `user` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL COMMENT '发件者用户名',
  PRIMARY KEY (`config_id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_bin COMMENT = '邮箱配置' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of tool_email_config
-- ----------------------------

SET FOREIGN_KEY_CHECKS = 1;
